The cdr\_tds module is NOT compatible with version 0.63 of FreeTDS.

The cdr\_tds module is known to work with FreeTDS version 0.62.1;
it should also work with 0.62.2, 0.62.3 and 0.62.4, which are bug
fix releases.

The cdr\_tds module uses the raw "libtds" API of FreeTDS. It appears
that from 0.63 onwards, this is not considered a published API
of FreeTDS and is subject to change without notice.

Between 0.62.x and 0.63 of FreeTDS, many incompatible changes
have been made to the libtds API.

For newer versions of FreeTDS, it is recommended that you use the
ODBC driver.

